INSERT INTO config (config_name,config_value,config_default,config_descr,config_group,config_group_order,config_sub_group,config_sub_group_order,config_hidden,config_disabled) values ('rrdtool','/usr/bin/rrdtool','/usr/bin/rrdtool','Path to rrdtool','external',0,'rrdtool',0,'0','0'), ('rrdtool.tune','false','false','Auto tune maximum value for rrd port files','external',0,'rrdtool',0,'0','0');
