CREATE TABLE `proxmox` ( `id` int(11) NOT NULL AUTO_INCREMENT, `device_id` int(11) NOT NULL DEFAULT '0', `vmid` int(11) NOT NULL, `cluster` varchar(255) NOT NULL, `description` varchar(255) DEFAULT NULL, `last_seen` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP, PRIMARY KEY (`id`), UNIQUE KEY `cluster_vm` (`cluster`,`vmid`)) ENGINE=InnoDB DEFAULT CHARSET=utf8; 
CREATE TABLE `proxmox_ports` ( `id` int(11) NOT NULL AUTO_INCREMENT, `vm_id` int(11) NOT NULL, `port` varchar(10) NOT NULL, `last_seen` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP, PRIMARY KEY (`id`), UNIQUE KEY `vm_port` (`vm_id`,`port`)) ENGINE=InnoDB DEFAULT CHARSET=utf8;
